)c (GeV/ Tp

Ratio to combined

0.7 0.8 0.9 1 1.1 1.2 1.3 -π +

+π^-π + ^+π

= 2.76 TeV NN s ALICE 0-5% Pb-Pb = 2.76 TeV s ALICE 0-5% Pb-Pb

ITS+TPC+TOF HMPID rdEdx

0.7 0.8 0.9 1 1.1 1.2 1.3 - + K +K^- +K

1.5 2 2.5 3 3.5 4 4.5 5 5.5 6 0.7 0.8 0.9 1 1.1 1.2 1.3 pp + pp +